\ProvidesPackage{m17n-lib}
%% Don't leave the space for marginal notes and foot notes.
\setlength{\textwidth}{\paperwidth}
\addtolength{\textwidth}{-2in}
\setlength{\textheight}{\paperheight}
\addtolength{\textheight}{-2in}
\addtolength{\textheight}{-\headheight}
\addtolength{\textheight}{-\headsep}
\setlength{\headwidth}{\textwidth}
\setlength{\topmargin}{0in}
\setlength{\oddsidemargin}{0in}
\setlength{\evensidemargin}{0in}
\setlength{\marginparsep}{0pt}
\setlength{\marginparwidth}{0pt}
\setlength{\footskip}{0pt}

%% Don't write footers.
\rfoot[]{}
\lfoot[]{}
\cfoot[]{}
\def\footrule{}

%% Hook function to print credit and add subsections to TOC.
\def\m17nhook{
\newpage
\thispagestyle{empty}
\vspace*{\fill}
Copyright (C) 2003\\
  National Institute of Advanced Industrial Science and Technology (AIST)\\
  Registration Number H15PRO112

This file is part of the m17n library.

The m17n library is free software; you can redistribute it and/or
modify it under the terms of the GNU General Public License as
published by the Free Software Foundation; either version 2, or (at
your option) any later version.

The m17n library is distributed in the hope that it will be useful,
but WITHOUT ANY WARRANTY; without even the implied warranty of
MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
GNU General Public License for more details.

You should have received a copy of the GNU General Public License
along with the m17n library; see the file COPYING.  If not, write to
the Free Software Foundation, Inc., 59 Temple Place - Suite 330,
Boston, MA 02111-1307, USA.
}

%% Run the above hook in the back of the title page.
\let\origendtitlepage\endtitlepage
\def\endtitlepage{\m17nhook\origendtitlepage}

%% Add Index section to the table of contents.
\let\origprintindex\printindex
\def\printindex{\addcontentsline{toc}{chapter}{Index}\origprintindex}
